ALTER TABLE `hot_hidden_danger_inspection`
    ADD COLUMN `instance_id` varchar(64) NULL COMMENT '流程实例ID' AFTER `project_type`,
ADD COLUMN `flow_status` varchar(32) NULL COMMENT '流程状态' AFTER `instance_id`;
