ALTER TABLE sys_flow_task
    ADD COLUMN is_read TINYINT(1) DEFAULT 0 COMMENT '是否已读';
ALTER TABLE sys_flow_task_his
    ADD COLUMN is_read TINYINT(1) DEFAULT 0 COMMENT '是否已读';
