CREATE TABLE IF NOT EXISTS `sys_user_electronic_signature` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `tenant_id` varchar(20) NOT NULL DEFAULT '000000' COMMENT '租户编号',
  `person_key` varchar(128) NOT NULL COMMENT '人员唯一标识，规则：loginPort:companyId:businessUserId，业务ID为空时回退为 userId',
  `user_id` bigint NOT NULL COMMENT '系统用户ID',
  `business_user_id` varchar(64) DEFAULT NULL COMMENT '业务人员ID',
  `company_id` bigint DEFAULT NULL COMMENT '企业ID',
  `login_port` varchar(64) NOT NULL COMMENT '登录端口',
  `sign_oss_id` bigint DEFAULT NULL COMMENT '电子签名图片OSS ID',
  `sign_name` varchar(64) DEFAULT NULL COMMENT '签署人名称快照',
  `status` char(1) NOT NULL DEFAULT '1' COMMENT '状态：1=已设置 0=未设置',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  `create_dept` bigint DEFAULT NULL COMMENT '创建部门',
  `create_by` bigint DEFAULT NULL COMMENT '创建人',
  `create_by_name` varchar(64) DEFAULT NULL COMMENT '创建人名称',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` bigint DEFAULT NULL COMMENT '更新人',
  `update_by_name` varchar(64) DEFAULT NULL COMMENT '更新人名称',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_tenant_person_key` (`tenant_id`, `person_key`),
  KEY `idx_user_id` (`user_id`),
  KEY `idx_business_user_id` (`business_user_id`),
  KEY `idx_company_id` (`company_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='用户电子签名配置表';
